Copyright: Norwegian Translator ® 1995 Crandol Software


Contents
Norwegian Translator Setup ...

Changing location of program  and database files.

By default your programs and database files install to C:\NORSK. You can change the path
for the database and program files to determine where they are to reside on the hard disk.
For example, if you want to change the database and program files path to D:\NORSK20,
move the files by using DOS or file manager. Next, press the "Setup" button from the main
menu and click "Change Norwegian Database Path." Type D:\NORSK20 and press Enter.

Configuring the Autoexec.bat file.

(Re: Windows 3.1 or earlier versions)

Special note about SHARE.EXE in your Autoexec.bat file: When running Windows 3.1 or
an earlier version of Windows, SHARE.EXE must be installed in your Autoexec.bat file, otherwise
the database will not operate properly.
The proper syntax is:
C:\DOS\SHARE.EXE /L:500

Maintaining NORSK.MDB (Norwegian Translator) database file.

Repair Database: You should only have to repair the database if Windows locks up and you are
forced to reboot the computer, or there was a sudden power interuption while the database was
in use. Click "Repair Norwegian Database" from the Setup menu.

Compact Database: This option will compact and clean the database. If you have deleted records
this will save space on your hard disk. Click "Compact Norwegian Database" from the Setup menu.